INSERT INTO `$TableName$` (`id`, `device_id`, `created_time`, `collection_time`, `receive_time`, `status`,
                           `device_time`, `run_mode`, `gas_status`, `plug_status`, `status_start_time`,
                           `status_end_time`, `oil_pressure`, `cas_pressure`, `pre_pressure`, `pipe_pressure`,
                           `liquid_level`, `temperature`, `humidity`, `op_mode`, `well_ctl`, `timer_able1`,
                           `timer_able2`, `timer_open1`, `timer_close1`, `timer_open2`, `timer_close2`,
                           `timing_open`, `timing_close`, `timing_delay`, `presource`, `pressure_open`,
                           `pressure_close`, `trigger_type`, `stability_time`, `max_open_well`, `max_close_well`,
                           `min_open_well`, `min_close_well`, `prespro_tect`, `prespro_source`,
                           `open_well_limit_max`, `open_well_limit_min`, `plug_init_status`, `plug_sustain_time`,
                           `plug_close_time`, `tp_init_status`, `tp_open_source`, `tp_open_trigger`,
                           `tp_open_pressure`, `tp_open_time`, `tp_close_source`, `tp_close_trigger`,
                           `tp_close_pressure`, `tp_close_time`, `tp_stability_time`)
VALUES (?, ?, NOW(), ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?,
        ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?);
