INSERT INTO `$TableName$` (`id`, `device_id`, `created_time`, `collection_time`, `receive_time`,
                           `device_time`, `run_mode`, `gas_status`, `plug_status`, `status_start_time`,
                           `status_end_time`, `oil_pressure`, `cas_pressure`, `pre_pressure`, `pipe_pressure`,
                           `liquid_level`, `temperature`, `humidity`, `op_mode`, `timer_able1`,
                           `timer_able2`, `timer_open1`, `timer_close1`, `timer_open2`, `timer_close2`,
                           `timing_open`, `timing_close`, `timing_delay`, `presource`, `pressure_open`,
                           `pressure_close`, `trigger_type`, `stability_time`, `max_open_well`, `max_close_well`,
                           `min_open_well`, `min_close_well`, `prespro_tect`, `prespro_source`,
                           `open_well_limit_max`, `open_well_limit_min`, `plug_init_status`, `plug_sustain_time`,
                           `plug_close_time`, `tp_init_status`, `tp_open_source`, `tp_open_trigger`,
                           `tp_open_pressure`, `tp_open_time`, `tp_close_source`, `tp_close_trigger`,
                           `tp_close_pressure`, `tp_close_time`, `tp_stability_time`)
VALUES (?, ?, NOW(), ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?,
        ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?, ?)
ON DUPLICATE KEY UPDATE receive_time=VALUES(receive_time),
                        device_time=VALUES(device_time),
                        run_mode=VALUES(run_mode),
                        gas_status=VALUES(gas_status),
                        plug_status=VALUES(plug_status),
                        status_start_time=VALUES(status_start_time),
                        status_end_time=VALUES(status_end_time),
                        oil_pressure=VALUES(oil_pressure),
                        cas_pressure=VALUES(cas_pressure),
                        pre_pressure=VALUES(pre_pressure),
                        pipe_pressure=VALUES(pipe_pressure),
                        liquid_level=VALUES(liquid_level),
                        temperature=VALUES(temperature),
                        humidity=VALUES(humidity),
                        op_mode=VALUES(op_mode),
                        timer_able1=VALUES(timer_able1),
                        timer_able2=VALUES(timer_able2),
                        timer_open1=VALUES(timer_open1),
                        timer_close1=VALUES(timer_close1),
                        timer_open2=VALUES(timer_open2),
                        timer_close2=VALUES(timer_close2),
                        timing_open=VALUES(timing_open),
                        timing_close=VALUES(timing_close),
                        timing_delay=VALUES(timing_delay),
                        presource=VALUES(presource),
                        pressure_open=VALUES(pressure_open),
                        pressure_close=VALUES(pressure_close),
                        trigger_type=VALUES(trigger_type),
                        stability_time=VALUES(stability_time),
                        max_open_well=VALUES(max_open_well),
                        max_close_well=VALUES(max_close_well),
                        min_open_well=VALUES(min_open_well),
                        min_close_well=VALUES(min_close_well),
                        prespro_tect=VALUES(prespro_tect),
                        prespro_source=VALUES(prespro_source),
                        open_well_limit_max=VALUES(open_well_limit_max),
                        open_well_limit_min=VALUES(open_well_limit_min),
                        plug_init_status=VALUES(plug_init_status),
                        plug_sustain_time=VALUES(plug_sustain_time),
                        plug_close_time=VALUES(plug_close_time),
                        tp_init_status=VALUES(tp_init_status),
                        tp_open_source=VALUES(tp_open_source),
                        tp_open_trigger=VALUES(tp_open_trigger),
                        tp_open_pressure=VALUES(tp_open_pressure),
                        tp_open_time=VALUES(tp_open_time),
                        tp_close_source=VALUES(tp_close_source),
                        tp_close_trigger=VALUES(tp_close_trigger),
                        tp_close_pressure=VALUES(tp_close_pressure),
                        tp_close_time=VALUES(tp_close_time),
                        tp_stability_time=VALUES(tp_stability_time)